Integrated optical cross strip interferometer

M. Lohmeyer, R. Stoffer, Faculty of Mathematical Sciences, University of Twente, Enschede, The Netherlands L. Wilkens, H. Dötsch, Department of Physics, University of Osnabrück, Osnabrück, Germany

Contact: Manfred Lohmeyer University of Twente, Faculty of Mathematical Sciences, Applied Analysis & Mathematical Physics Group P.O. Box 217, 7500 AE Enschede, The Netherlands Phone: +31/53/489-3448 Fax: +31/53/489-4888 E-mail: m.lohmeyer@math.utwente.nl