Resonator chains of 2-D square dielectric optical microcavities

Manfred Hammer, MESA^+ Institute for Nanotechnology, University of Twente, Enschede, The Netherlands

Contact: Manfred Hammer University of Twente, Department of Applied Mathematics Applied Analysis & Mathematical Physics Group, P.O. Box 217, 7500 AE Enschede, The Netherlands Phone: ++31/53/489-3448 Fax: ++31/53/489-4833 E-mail: m.hammer@math.utwente.nl